From 32d7646db11ebbd0cd250149d45aa57d814b89d1 Mon Sep 17 00:00:00 2001
From: User <chip@smux.be>
Date: Tue, 29 May 2018 21:44:45 +0200
Subject: Fix the height of file inputs

---
 src/components/user_settings/user_settings.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/user_settings/user_settings.vue')

diff --git a/src/components/user_settings/user_settings.vue b/src/components/user_settings/user_settings.vue
index 9860c5f9..bc7aa3d0 100644
--- a/src/components/user_settings/user_settings.vue
+++ b/src/components/user_settings/user_settings.vue
@@ -121,6 +121,7 @@
 
   input[type=file] {
     padding: 5px;
+    height: auto;
   }
 
   .banner {
-- 
cgit v1.2.3-70-g09d2

