From 3dacef944cf6980dc3a3c1843d5b3f94b851240a Mon Sep 17 00:00:00 2001
From: Dym Sohin <re@dym.sh>
Date: Thu, 24 Sep 2020 12:05:51 +0200
Subject: remove bio-table's max-width

---
 src/components/user_profile/user_profile.vue | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'src/components/user_profile/user_profile.vue')

diff --git a/src/components/user_profile/user_profile.vue b/src/components/user_profile/user_profile.vue
index c7c67c0a..b26499b4 100644
--- a/src/components/user_profile/user_profile.vue
+++ b/src/components/user_profile/user_profile.vue
@@ -156,8 +156,7 @@
 
     .user-profile-field {
       display: flex;
-      margin: 0.25em auto;
-      max-width: 32em;
+      margin: 0.25em;
       border: 1px solid var(--border, $fallback--border);
       border-radius: $fallback--inputRadius;
       border-radius: var(--inputRadius, $fallback--inputRadius);
-- 
cgit v1.2.3-70-g09d2

