From 33d92f9b16267415d1e62285a4f305ae10baf489 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 20 Apr 2022 23:55:34 +0300
Subject: relative units in line-height + some cleanup

---
 src/components/user_profile/user_profile.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_profile/user_profile.vue')

diff --git a/src/components/user_profile/user_profile.vue b/src/components/user_profile/user_profile.vue
index f1e3cb72..67966ff4 100644
--- a/src/components/user_profile/user_profile.vue
+++ b/src/components/user_profile/user_profile.vue
@@ -176,7 +176,7 @@
       }
 
       .user-profile-field-name, .user-profile-field-value {
-        line-height: 18px;
+        line-height: 1.3;
         text-overflow: ellipsis;
         white-space: nowrap;
         overflow: hidden;
-- 
cgit v1.2.3-70-g09d2

