From a190389f3c9f44072465560dce7203e9ce328f2c Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 4 Mar 2024 18:24:29 +0200
Subject: panels/statuses are looking really good now even with transparency

---
 src/components/user_panel/user_panel.vue | 13 ++++++++++---
 1 file changed, 10 insertions(+), 3 deletions(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 95ec97af..9323b65e 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -22,8 +22,15 @@
 <script src="./user_panel.js"></script>
 
 <style lang="scss">
-.user-panel .signed-in {
-  overflow: visible;
-  z-index: 10;
+.user-panel {
+  .panel {
+    background: var(--background);
+    backdrop-filter: var(--backdrop-filter);
+  }
+
+  .signed-in {
+    overflow: visible;
+    z-index: 10;
+  }
 }
 </style>
-- 
cgit v1.2.3-70-g09d2

