From 90981dcce6bbed1ba7700a7f1f4d74838e217b55 Mon Sep 17 00:00:00 2001
From: taehoon <th.dev91@gmail.com>
Date: Tue, 17 Sep 2019 22:32:17 -0400
Subject: remove needless condition

---
 src/components/user_panel/user_panel.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index c92630e3..e859d612 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -11,7 +11,7 @@
         rounded="top"
       />
       <div class="panel-footer">
-        <post-status-form v-if="user" />
+        <post-status-form />
       </div>
     </div>
     <auth-form
-- 
cgit v1.2.3-70-g09d2

