From aa0564406a95824cc45c815571292716b65806a1 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sat, 31 Mar 2018 21:14:36 +0300
Subject: getting rid of baseXX, some small fixes. Seems to be usable.

---
 src/components/user_panel/user_panel.vue | 10 +++++++++-
 1 file changed, 9 insertions(+), 1 deletion(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 1a5e20fb..7da767b7 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -2,7 +2,7 @@
   <div class="user-panel">
     <div v-if='user' class="panel panel-default" style="overflow: visible;">
       <user-card-content :user="user" :switcher="false"></user-card-content>
-      <div class="panel-footer base00-background">
+      <div class="panel-footer">
         <post-status-form v-if='user'></post-status-form>
       </div>
     </div>
@@ -11,3 +11,11 @@
 </template>
 
 <script src="./user_panel.js"></script>
+
+<style lang="scss">
+  .user-panel {
+    .panel-heading {
+      background: transparent;
+    }
+  }
+</style>
-- 
cgit v1.2.3-70-g09d2

