From 96692454a0692166971072da357e6ae077844bfe Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Sat, 14 Apr 2018 10:19:09 +0300
Subject: change external link icon, move chat from side panel to floating,
 hide own bio, prevent body/app from scrolling horizontally.

---
 src/components/user_panel/user_panel.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 05af7bc3..3d4f873d 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -1,7 +1,7 @@
 <template>
   <div class="user-panel">
     <div v-if='user' class="panel panel-default" style="overflow: visible;">
-      <user-card-content :user="user" :switcher="false"></user-card-content>
+      <user-card-content :user="user" :switcher="false" :hideBio="true"></user-card-content>
       <div class="panel-footer">
         <post-status-form v-if='user'></post-status-form>
       </div>
-- 
cgit v1.2.3-70-g09d2

