From 7ce6bbcf30746a1691a8ff1e09048c78ec350bbe Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Fri, 28 Oct 2016 14:26:23 +0200
Subject: Fix user panel bg image.

---
 src/components/user_panel/user_panel.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 9fcb4856..29831fbc 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -1,8 +1,8 @@
 <template>
   <div class="user-panel">
-    <div v-if='user' class="panel panel-default" v-bind:style="style">
+    <div v-if='user' class="panel panel-default">
       <!-- Default panel contents -->
-      <div class="panel-heading text-center">
+      <div class="panel-heading text-center" v-bind:style="style">
         <div class='user-info'>
           <img :src="user.profile_image_url">
           <span class="glyphicon glyphicon-user"></span>
-- 
cgit v1.2.3-70-g09d2

