From 79805584613bd3d3ec5fba6481fc1ba02986a1a8 Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Sun, 30 Oct 2016 16:53:58 +0100
Subject: Basic status posting.

---
 src/components/user_panel/user_panel.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 29831fbc..6b986f84 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -29,7 +29,7 @@
       </div>
 
       <div class="panel-footer">
-        <post-status-form></post-status-form>
+        <post-status-form v-if='user'></post-status-form>
       </div>
     </div>
     <login-form v-if='!user'></login-form>
-- 
cgit v1.2.3-70-g09d2

