From 8d6750d9c2816e33a0444cd978f94009d8b85d47 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 5 Jul 2019 10:17:44 +0300
Subject: eslint --fix --ext .js,.vue src

---
 src/components/user_panel/user_panel.vue | 20 +++++++++++++++-----
 1 file changed, 15 insertions(+), 5 deletions(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 37e28ca5..c92630e3 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -1,13 +1,23 @@
 <template>
   <div class="user-panel">
-
-    <div v-if="signedIn" key="user-panel" class="panel panel-default signed-in">
-      <UserCard :user="user" :hideBio="true" rounded="top"/>
+    <div
+      v-if="signedIn"
+      key="user-panel"
+      class="panel panel-default signed-in"
+    >
+      <UserCard
+        :user="user"
+        :hide-bio="true"
+        rounded="top"
+      />
       <div class="panel-footer">
-        <post-status-form v-if='user'></post-status-form>
+        <post-status-form v-if="user" />
       </div>
     </div>
-    <auth-form v-else key="user-panel"/>
+    <auth-form
+      v-else
+      key="user-panel"
+    />
   </div>
 </template>
 
-- 
cgit v1.2.3-70-g09d2

