From d4f9d21857ae1dffce0d4627e536038138e015a5 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 3 Sep 2018 22:23:53 +0300
Subject: Fix last place with usercard having wrong width

---
 src/components/user_panel/user_panel.vue | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 3d4f873d..2d5cb500 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -14,8 +14,10 @@
 
 <style lang="scss">
 .user-panel {
-    .profile-panel-background .panel-heading {
-        background: transparent;
-    }
+  .profile-panel-background .panel-heading {
+    background: transparent;
+    flex-direction: column;
+    align-items: stretch;
+  }
 }
 </style>
-- 
cgit v1.2.3-70-g09d2

