From 262760d2586cac48da27cf7eb5389116d4023dfe Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 10 Apr 2019 21:48:42 +0300
Subject: revert unnecessary changes

---
 src/components/user_panel/user_panel.vue | 16 ++++------------
 1 file changed, 4 insertions(+), 12 deletions(-)

(limited to 'src/components/user_panel/user_panel.vue')

diff --git a/src/components/user_panel/user_panel.vue b/src/components/user_panel/user_panel.vue
index 18bf2a3b..8310f30e 100644
--- a/src/components/user_panel/user_panel.vue
+++ b/src/components/user_panel/user_panel.vue
@@ -1,20 +1,12 @@
 <template>
   <div class="user-panel">
-    <div
-      v-if="user"
-      class="panel panel-default"
-      style="overflow: visible;"
-    >
-      <UserCard
-        :user="user"
-        :hide-bio="true"
-        rounded="top"
-      />
+    <div v-if='user' class="panel panel-default" style="overflow: visible;">
+      <UserCard :user="user" :hideBio="true" rounded="top"/>
       <div class="panel-footer">
-        <post-status-form v-if="user" />
+        <post-status-form v-if='user'></post-status-form>
       </div>
     </div>
-    <login-form v-if="!user" />
+    <login-form v-if='!user'></login-form>
   </div>
 </template>
 
-- 
cgit v1.2.3-70-g09d2

