From 69ef9101d4066df5df6780a2bfaeaa949869df02 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shpuld@gmail.com>
Date: Thu, 13 Apr 2017 17:57:20 +0300
Subject: Fix login screen, (remove one duplicate line from user card css).

---
 src/components/user_card_content/user_card_content.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/user_card_content/user_card_content.vue')

diff --git a/src/components/user_card_content/user_card_content.vue b/src/components/user_card_content/user_card_content.vue
index 7b89a7f2..bba16584 100644
--- a/src/components/user_card_content/user_card_content.vue
+++ b/src/components/user_card_content/user_card_content.vue
@@ -116,7 +116,6 @@
 }
 
 .profile-panel-body {
-  padding-top: 0em;
   top: -0em;
   padding-top: 4em;
 }
-- 
cgit v1.2.3-70-g09d2

