From 33b962b13e34978c51500f7c72fef6bebc8ea37d Mon Sep 17 00:00:00 2001
From: ValD <maghtpol@gmail.com>
Date: Wed, 12 Dec 2018 23:56:12 +0530
Subject: removed counters from left panel

---
 src/components/user_card_content/user_card_content.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_card_content/user_card_content.vue')

diff --git a/src/components/user_card_content/user_card_content.vue b/src/components/user_card_content/user_card_content.vue
index 4f171a56..a6075e4b 100644
--- a/src/components/user_card_content/user_card_content.vue
+++ b/src/components/user_card_content/user_card_content.vue
@@ -90,7 +90,7 @@
       </div>
     </div>
   </div>
-  <div class="panel-body profile-panel-body">
+  <div class="panel-body profile-panel-body" v-if="switcher">
     <div v-if="!hideUserStatsLocal || switcher" class="user-counts" :class="{clickable: switcher}">
       <div class="user-count" v-on:click.prevent="setProfileView('statuses')" :class="{selected: selected === 'statuses'}">
         <h5>{{ $t('user_card.statuses') }}</h5>
-- 
cgit v1.2.3-70-g09d2

