From a190389f3c9f44072465560dce7203e9ce328f2c Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 4 Mar 2024 18:24:29 +0200
Subject: panels/statuses are looking really good now even with transparency

---
 src/components/user_card/user_card.vue | 5 +----
 1 file changed, 1 insertion(+), 4 deletions(-)

(limited to 'src/components/user_card/user_card.vue')

diff --git a/src/components/user_card/user_card.vue b/src/components/user_card/user_card.vue
index 0f627f62..70c4f67d 100644
--- a/src/components/user_card/user_card.vue
+++ b/src/components/user_card/user_card.vue
@@ -282,10 +282,7 @@
         />
       </div>
     </div>
-    <div
-      v-if="!hideBio"
-      class="panel-body"
-    >
+    <div v-if="!hideBio">
       <div
         v-if="!mergedConfig.hideUserStats && switcher"
         class="user-counts"
-- 
cgit v1.2.3-70-g09d2

