From c44c0483566efc8c48361e4143b25d852cecede4 Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Wed, 1 May 2019 17:33:56 +0300
Subject: add title and alt for avatars, fix console errors in avatarlist

---
 src/components/user_card/user_card.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/user_card/user_card.vue')

diff --git a/src/components/user_card/user_card.vue b/src/components/user_card/user_card.vue
index e1d3ff57..e62b384d 100644
--- a/src/components/user_card/user_card.vue
+++ b/src/components/user_card/user_card.vue
@@ -4,7 +4,7 @@
     <div class='user-info'>
       <div class='container'>
         <router-link :to="userProfileLink(user)">
-          <UserAvatar :betterShadow="betterShadow" :src="user.profile_image_url_original"/>
+          <UserAvatar :betterShadow="betterShadow" :user="user"/>
         </router-link>
         <div class="name-and-screen-name">
           <div class="top-line">
-- 
cgit v1.2.3-70-g09d2

