From 015bf78dd9b17a1eac11119e38d8e83be8d791ae Mon Sep 17 00:00:00 2001
From: shpuld <shpuld@gmail.com>
Date: Sun, 26 Feb 2017 22:36:54 +0200
Subject: Heading text floats left, initial attempt at load more in the right
 side of the heading.

---
 src/components/timeline/timeline.vue | 12 +++++++++---
 1 file changed, 9 insertions(+), 3 deletions(-)

(limited to 'src/components/timeline/timeline.vue')

diff --git a/src/components/timeline/timeline.vue b/src/components/timeline/timeline.vue
index 45886f6c..078d954c 100644
--- a/src/components/timeline/timeline.vue
+++ b/src/components/timeline/timeline.vue
@@ -1,7 +1,7 @@
 <template>
   <div class="timeline">
     <a href="#" v-on:click.prevent='showNewStatuses()' v-if="timeline.newStatusCount > 0">
-      <div class="base01-background base05-border new-status-notification">
+      <div class="base00-background base05-border new-status-notification">
         <p class="text-center" >
           {{timeline.newStatusCount}} new statuses
         </p>
@@ -22,12 +22,18 @@
 <style lang="scss">
  .new-status-notification {
    border-style: solid;
-   border-width: 1px 0 1px 0;
+   float: right;
+   border-width: 1px 1px 0px 1px;
+   border-radius: 5px 5px 0 0;
    font-size: 1.1em;
+   margin-top: -2.08em;
+   margin-right: 0.8em;
+   max-width: 200px;
+   max-height: 2em;
 
    p {
      margin: 0px;
-     padding: 10px;
+     padding: 0.6em;
    }
  }
 </style>
-- 
cgit v1.2.3-70-g09d2

