From 97bb03a00c6c200ad0cfe6b1b4bf11a9b4352514 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shpuld@gmail.com>
Date: Wed, 21 Jun 2017 17:19:56 +0300
Subject: Fix consistency in font families between chromium and ff

---
 src/components/timeline/timeline.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/timeline/timeline.vue')

diff --git a/src/components/timeline/timeline.vue b/src/components/timeline/timeline.vue
index 9c13fd99..dbd0d948 100644
--- a/src/components/timeline/timeline.vue
+++ b/src/components/timeline/timeline.vue
@@ -55,7 +55,7 @@
       font-size: 14px;
       min-width: 6em;
       border-radius: 5px;
-      font-family: arial;
+      font-family: sans;
       text-align: center;
       padding: 0 0.5em 0 0.5em;
       opacity: 0.8;
-- 
cgit v1.2.3-70-g09d2

