From 9061fa36ac1428771628731aef48e203a6b89b34 Mon Sep 17 00:00:00 2001
From: shpuld <shpuld@gmail.com>
Date: Sat, 11 Mar 2017 03:23:34 +0200
Subject: Change the small buttons (Read and Show new) to look better on chrome
 and other non-firefox browsers.

---
 src/components/timeline/timeline.vue | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'src/components/timeline/timeline.vue')

diff --git a/src/components/timeline/timeline.vue b/src/components/timeline/timeline.vue
index 84defac7..08733f4f 100644
--- a/src/components/timeline/timeline.vue
+++ b/src/components/timeline/timeline.vue
@@ -43,8 +43,10 @@
     .loadmore-button {
       position: absolute;
       right: 0.6em;
-      padding: 0.1em 0.3em 0.25em 0.3em;
+
       min-width: 6em;
+      height: 1.8em;
+      line-height: 100%;
     }
     .error {
       background-color: rgba(255, 48, 16, 0.65);
-- 
cgit v1.2.3-70-g09d2

