From 8a590f9269086ac737869e948954c74d6317541e Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 8 Mar 2021 19:18:43 +0200
Subject: Cleaned up panel-footer. No longer uses header styles since those
 look and work ugly.

---
 src/components/timeline/timeline.vue | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'src/components/timeline/timeline.vue')

diff --git a/src/components/timeline/timeline.vue b/src/components/timeline/timeline.vue
index 286477c2..729c4c44 100644
--- a/src/components/timeline/timeline.vue
+++ b/src/components/timeline/timeline.vue
@@ -52,13 +52,13 @@
     <div :class="classes.footer">
       <div
         v-if="count===0"
-        class="new-status-notification text-center panel-footer faint"
+        class="new-status-notification text-center faint"
       >
         {{ $t('timeline.no_statuses') }}
       </div>
       <div
         v-else-if="bottomedOut"
-        class="new-status-notification text-center panel-footer faint"
+        class="new-status-notification text-center faint"
       >
         {{ $t('timeline.no_more_statuses') }}
       </div>
@@ -67,13 +67,13 @@
         class="button-unstyled -link -fullwidth"
         @click.prevent="fetchOlderStatuses()"
       >
-        <div class="new-status-notification text-center panel-footer">
+        <div class="new-status-notification text-center">
           {{ $t('timeline.load_older') }}
         </div>
       </button>
       <div
         v-else
-        class="new-status-notification text-center panel-footer"
+        class="new-status-notification text-center"
       >
         <FAIcon
           icon="circle-notch"
-- 
cgit v1.2.3-70-g09d2

