From 38d8526660df4ca664c9ea50a660868be2cb5e49 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 30 Jun 2020 17:37:36 +0300
Subject: change Show New text to Reload when flushing

---
 src/components/timeline/timeline.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/timeline/timeline.vue')

diff --git a/src/components/timeline/timeline.vue b/src/components/timeline/timeline.vue
index bd8389b9..111c0976 100644
--- a/src/components/timeline/timeline.vue
+++ b/src/components/timeline/timeline.vue
@@ -23,7 +23,7 @@
         class="loadmore-button"
         @click.prevent="showNewStatuses"
       >
-        {{ $t('timeline.show_new') }}{{ newStatusCountStr }}
+        {{ loadButtonString }}
       </button>
       <div
         v-else
-- 
cgit v1.2.3-70-g09d2

