From d7af2c8419df59d8b897bc57e94f6cc67bd60eca Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 20 Nov 2018 23:25:38 +0300
Subject: mentioned bug in tab-switcher, made shadow-control work in zero-state

---
 src/components/tab_switcher/tab_switcher.jsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/tab_switcher/tab_switcher.jsx')

diff --git a/src/components/tab_switcher/tab_switcher.jsx b/src/components/tab_switcher/tab_switcher.jsx
index 3fff38f6..ea582450 100644
--- a/src/components/tab_switcher/tab_switcher.jsx
+++ b/src/components/tab_switcher/tab_switcher.jsx
@@ -1,5 +1,7 @@
 import Vue from 'vue'
 
+// FIXME: This doesn't like v-if directly inside the tab's contents, breaks vue really bad
+
 import './tab_switcher.scss'
 
 export default Vue.component('tab-switcher', {
-- 
cgit v1.2.3-70-g09d2

