From fa2fcc882737c8c057fd12d4cc1a85d67f3b672e Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 13 Jan 2020 01:54:56 +0200
Subject: better fallbacks in UI

---
 src/components/style_switcher/style_switcher.vue | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'src/components/style_switcher/style_switcher.vue')

diff --git a/src/components/style_switcher/style_switcher.vue b/src/components/style_switcher/style_switcher.vue
index 1381f1fb..c1ec7c9a 100644
--- a/src/components/style_switcher/style_switcher.vue
+++ b/src/components/style_switcher/style_switcher.vue
@@ -251,7 +251,7 @@
             <ColorInput
               v-model="panelColorLocal"
               name="panelColor"
-              :fallback="fgColorLocal"
+              :fallback="previewTheme.colors.panel"
               :label="$t('settings.background')"
             />
             <OpacityInput
@@ -286,7 +286,7 @@
             <ColorInput
               v-model="topBarColorLocal"
               name="topBarColor"
-              :fallback="fgColorLocal"
+              :fallback="previewTheme.colors.topBar"
               :label="$t('settings.background')"
             />
             <ColorInput
@@ -309,7 +309,7 @@
             <ColorInput
               v-model="inputColorLocal"
               name="inputColor"
-              :fallback="fgColorLocal"
+              :fallback="previewTheme.colors.input"
               :label="$t('settings.background')"
             />
             <OpacityInput
@@ -331,7 +331,7 @@
             <ColorInput
               v-model="btnColorLocal"
               name="btnColor"
-              :fallback="fgColorLocal"
+              :fallback="previewTheme.colors.btn"
               :label="$t('settings.background')"
             />
             <OpacityInput
-- 
cgit v1.2.3-70-g09d2

