From e4033c85e2066d8a575a1cd8e5a59bb685a3adf0 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 20 Jan 2020 00:34:49 +0200
Subject: removed console logs

---
 src/components/style_switcher/style_switcher.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/style_switcher/style_switcher.vue')

diff --git a/src/components/style_switcher/style_switcher.vue b/src/components/style_switcher/style_switcher.vue
index c8c02b8d..287d31b7 100644
--- a/src/components/style_switcher/style_switcher.vue
+++ b/src/components/style_switcher/style_switcher.vue
@@ -691,7 +691,7 @@
               {{ $t('settings.style.switcher.clear_all') }}
             </button>
           </div>
-          <shadow-control
+          <ShadowControl
             v-model="currentShadow"
             :ready="!!currentShadowFallback"
             :fallback="currentShadowFallback"
-- 
cgit v1.2.3-70-g09d2

