From d7af2c8419df59d8b897bc57e94f6cc67bd60eca Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 20 Nov 2018 23:25:38 +0300
Subject: mentioned bug in tab-switcher, made shadow-control work in zero-state

---
 src/components/style_switcher/style_switcher.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/style_switcher/style_switcher.vue')

diff --git a/src/components/style_switcher/style_switcher.vue b/src/components/style_switcher/style_switcher.vue
index 5f0c2566..5cf75636 100644
--- a/src/components/style_switcher/style_switcher.vue
+++ b/src/components/style_switcher/style_switcher.vue
@@ -198,7 +198,7 @@
             <label class="checkbox-label" for="override"></label>
           </div>
         </div>
-        <shadow-control v-if="currentShadowFallback" :fallback="currentShadowFallback" v-model="currentShadow"/>
+        <shadow-control :fallback="currentShadowFallback" v-model="currentShadow"/>
       </div>
     </tab-switcher>
   </keep-alive>
-- 
cgit v1.2.3-70-g09d2

