From 91ea9b7b0e7b2ad818c0ac026951cd5a9c68bfdf Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 23 Nov 2018 07:28:53 +0300
Subject: checkbox radius

---
 src/components/style_switcher/style_switcher.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/style_switcher/style_switcher.vue')

diff --git a/src/components/style_switcher/style_switcher.vue b/src/components/style_switcher/style_switcher.vue
index 37709363..6463a4ca 100644
--- a/src/components/style_switcher/style_switcher.vue
+++ b/src/components/style_switcher/style_switcher.vue
@@ -135,7 +135,8 @@
         <div>
           <p>{{$t('settings.radii_help')}}</p>
           <RangeInput name="btnRadius" :label="$t('settings.btnRadius')" v-model="btnRadiusLocal" :fallback="previewTheme.radii.btn" max="16" hardMin="0"/>
-          <RangeInput name="inputRadius" :label="$t('settings.inputRadius')" v-model="inputRadiusLocal" :fallback="previewTheme.radii.input" max="16" hardMin="0"/>
+          <RangeInput name="inputRadius" :label="$t('settings.inputRadius')" v-model="inputRadiusLocal" :fallback="previewTheme.radii.input" max="9" hardMin="0"/>
+          <RangeInput name="checkboxRadius" :label="$t('settings.checkboxRadius')" v-model="checkboxRadiusLocal" :fallback="previewTheme.radii.checkbox" max="16" hardMin="0"/>
           <RangeInput name="panelRadius" :label="$t('settings.panelRadius')" v-model="panelRadiusLocal" :fallback="previewTheme.radii.panel" max="50" hardMin="0"/>
           <RangeInput name="avatarRadius" :label="$t('settings.avatarRadius')" v-model="avatarRadiusLocal" :fallback="previewTheme.radii.avatar" max="28" hardMin="0"/>
           <RangeInput name="avatarAltRadius" :label="$t('settings.avatarAltRadius')" v-model="avatarAltRadiusLocal" :fallback="previewTheme.radii.avatarAlt" max="28" hardMin="0"/>
-- 
cgit v1.2.3-70-g09d2

