From 26b9f787bb01551f991f9e79aa8c0fc59313b95e Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 23 Nov 2018 10:17:01 +0300
Subject: added "keep opacity" option, fixed opacity loading, fixed missing
 shadows not affecting the preview (i.e. previewing pleroma-dark when redmond
 is applied)

---
 src/components/style_switcher/style_switcher.vue | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'src/components/style_switcher/style_switcher.vue')

diff --git a/src/components/style_switcher/style_switcher.vue b/src/components/style_switcher/style_switcher.vue
index 0c6b811d..ed0dd733 100644
--- a/src/components/style_switcher/style_switcher.vue
+++ b/src/components/style_switcher/style_switcher.vue
@@ -32,6 +32,13 @@
           v-model="keepShadows">
         <label for="keep-shadows">{{$t('settings.style.switcher.keep_shadows')}}</label>
       </span>
+      <span>
+        <input
+          id="keep-opacity"
+          type="checkbox"
+          v-model="keepOpacity">
+        <label for="keep-opacity">{{$t('settings.style.switcher.keep_opacity')}}</label>
+      </span>
       <span>
         <input
           id="keep-roundness"
-- 
cgit v1.2.3-70-g09d2

