From 4bbc3ada5d12cfd1dbccbdcb081246b00735452a Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 8 Apr 2018 14:45:12 +0300
Subject: fix some incorrect radii

---
 src/components/still-image/still-image.vue | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'src/components/still-image/still-image.vue')

diff --git a/src/components/still-image/still-image.vue b/src/components/still-image/still-image.vue
index 5fefe714..071e0380 100644
--- a/src/components/still-image/still-image.vue
+++ b/src/components/still-image/still-image.vue
@@ -16,7 +16,7 @@
   width: 100%;
   height: 100%
 
-  &:hover canvas {
+            &:hover canvas {
     display: none;
   }
 
@@ -46,7 +46,8 @@
       color: #FFF;
       display: block;
       padding: 2px 4px;
-      border-radius: 3px;
+      border-radius: $fallback--tooltipRadius;
+      border-radius: var(--tooltipRadius, $fallback--tooltipRadius);
       z-index: 2;
     }
   }
-- 
cgit v1.2.3-70-g09d2

