From 636dbdaba8375cb991368620419e2997df0f57a9 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 13 Jun 2021 22:22:59 +0300
Subject: more fixes

---
 src/components/status_body/status_body.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/status_body/status_body.vue')

diff --git a/src/components/status_body/status_body.vue b/src/components/status_body/status_body.vue
index 0eb11ad0..3dc4916c 100644
--- a/src/components/status_body/status_body.vue
+++ b/src/components/status_body/status_body.vue
@@ -56,7 +56,7 @@
             @parseReady="setHeadTailLinks"
           />
           <MentionsLine
-            v-if="!hideMentions && lastMentions.length > 0 && firstMentions.length <= 1"
+            v-if="!hideMentions && lastMentions.length > 1 && firstMentions.length <= 1"
             :mentions="lastMentions"
           />
         </span>
-- 
cgit v1.2.3-70-g09d2

