From dc0fd8177ce017d10195f4ac00429d4f8143a4ef Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Thu, 12 Apr 2018 20:03:03 +0300
Subject: Fix status preview loader having different offset from the actual
 stats preview

---
 src/components/status/status.vue | 10 ++++++----
 1 file changed, 6 insertions(+), 4 deletions(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index 7607cd7b..483abb3e 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -64,7 +64,7 @@
 
           <div v-if="showPreview" class="status-preview-container">
             <status class="status-preview" v-if="preview" :noReplyLinks="true" :statusoid="preview" :compact=true></status>
-            <div class="status-preview status-preview-loading base00-background base03-border" v-else>
+            <div class="status-preview status-preview-loading" v-else>
               <i class="icon-spin4 animate-spin"></i>
             </div>
           </div>
@@ -146,12 +146,14 @@
 
 .status-preview-loading {
   display: block;
-  font-size: 2em;
-  min-width: 8em;
-  padding: 0.5em;
+  min-width: 15em;
+  padding: 1em;
   text-align: center;
   border-width: 1px;
   border-style: solid;
+  i {
+    font-size: 2em;
+  }
 }
 
 .status-el {
-- 
cgit v1.2.3-70-g09d2

