From 61f34ff361a24a287ac0bf0c79fd2f77b4f2b708 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Sun, 28 Jun 2020 16:40:39 +0300
Subject: remove panel-footer in userpanel, simplify preview header, fix
 word-wrap in preview

---
 src/components/status/status.vue | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index 7ec29b28..1c36d883 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -372,9 +372,6 @@ $status-margin: 0.75em;
 }
 
 .status-el {
-  overflow-wrap: break-word;
-  word-wrap: break-word;
-  word-break: break-word;
   border-left-width: 0px;
   min-width: 0;
   border-color: $fallback--border;
-- 
cgit v1.2.3-70-g09d2

