From 4dbc6a3c56c8f8b929bccb4c7bd95c178f64dccd Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Wed, 6 Feb 2019 22:17:06 +0200
Subject: Fix repeater html not showing properly

---
 src/components/status/status.vue | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index 9986107f..21eb4d56 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -16,9 +16,8 @@
         <UserAvatar v-if="retweet" :betterShadow="betterShadow" :src="statusoid.user.profile_image_url_original"/>
         <div class="media-body faint">
           <span class="user-name">
-            <router-link :to="retweeterProfileLink">
-              {{retweeterHtml || retweeter}}
-            </router-link>
+            <router-link v-if="retweeterHtml" :to="retweeterProfileLink" v-html="retweeterHtml"/>
+            <router-link v-else :to="retweeterProfileLink">{{retweeter}}</router-link>
           </span>
           <i class='fa icon-retweet retweeted' :title="$t('tool_tip.repeat')"></i>
           {{$t('timeline.repeated')}}
-- 
cgit v1.2.3-70-g09d2

