From 8f63bbb64fa2860e73d8562de9d6c62629a8668f Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 13 Jan 2020 00:33:04 +0200
Subject: poll slot renamed, lightBg customization implemented

---
 src/components/status/status.vue | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index d291e762..72e9b25a 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -446,6 +446,11 @@ $status-margin: 0.75em;
   &_focused {
     background-color: $fallback--lightBg;
     background-color: var(--lightBg, $fallback--lightBg);
+    color: $fallback--text;
+    color: var(--lightBgText, $fallback--text);
+    --faint: var(--lightBgFaintText, $fallback--faint);
+    --faintLink: var(--lightBgFaintLink, $fallback--faint);
+    --icon: var(--lightBgIcon, $fallback--icon);
   }
 
   .timeline & {
@@ -573,8 +578,6 @@ $status-margin: 0.75em;
       overflow: hidden;
       text-overflow: ellipsis;
       margin: 0 0.4em 0 0.2em;
-      color: $fallback--faint;
-      color: var(--faint, $fallback--faint);
     }
 
     .replies-separator {
-- 
cgit v1.2.3-70-g09d2

