From 3e23b341687a94e0b5df74447a5e19bbfb59343b Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Mon, 22 Apr 2019 21:07:29 +0300
Subject: fix overflow behavior

---
 src/components/status/status.vue | 12 +++---------
 1 file changed, 3 insertions(+), 9 deletions(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index d79bb2b9..a9ce722c 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -639,15 +639,13 @@ a.unmute {
     line-height: 1em;
 
     .stat-count {
-      margin-right: 0.8em;
+      margin-right: $status-margin;
 
       .stat-title {
         color: var(--faint, $fallback--faint);
         font-size: 12px;
         text-transform: uppercase;
         position: relative;
-        margin-bottom: 3px;
-        line-height: 1em;
       }
 
       .stat-number {
@@ -661,6 +659,8 @@ a.unmute {
       flex: 1;
       overflow: hidden;
       position: relative;
+      display: flex;
+      align-items: center;
 
       &::before {
         content: '';
@@ -671,12 +671,6 @@ a.unmute {
         background-color: var(--faint, $fallback--faint);
       }
     }
-
-    li {
-      display: flex;
-      flex-direction: column;
-      justify-content: center;
-    }
   }
 }
 
-- 
cgit v1.2.3-70-g09d2

