From 2d826abb41833d927ef9dcb39082e52d7892c548 Mon Sep 17 00:00:00 2001
From: Brenden Bice <brenden.next@gmail.com>
Date: Sat, 6 Apr 2019 14:38:08 -0400
Subject: use normal font weight instead of lighter

---
 src/components/status/status.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/status/status.vue')

diff --git a/src/components/status/status.vue b/src/components/status/status.vue
index ea929b6b..a56fc31f 100644
--- a/src/components/status/status.vue
+++ b/src/components/status/status.vue
@@ -645,7 +645,6 @@ a.unmute {
 
       .stat-title {
         color: var(--faint, $fallback--faint);
-        font-weight: lighter;
         font-size: 12px;
         text-transform: uppercase;
         position: relative;
-- 
cgit v1.2.3-70-g09d2

