From 7b99d98c553f40ec4d633d0d4fdf65f275c80e77 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 24 Nov 2020 12:32:42 +0200
Subject: Replace all use of <a> + href='#' with proper buttons

---
 src/components/shadow_control/shadow_control.vue | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'src/components/shadow_control/shadow_control.vue')

diff --git a/src/components/shadow_control/shadow_control.vue b/src/components/shadow_control/shadow_control.vue
index 78f0e544..37d491f0 100644
--- a/src/components/shadow_control/shadow_control.vue
+++ b/src/components/shadow_control/shadow_control.vue
@@ -84,7 +84,7 @@
           />
         </label>
         <button
-          class="btn btn-default"
+          class="btn button-default"
           :disabled="!ready || !present"
           @click="del"
         >
@@ -94,7 +94,7 @@
           />
         </button>
         <button
-          class="btn btn-default"
+          class="btn button-default"
           :disabled="!moveUpValid"
           @click="moveUp"
         >
@@ -104,7 +104,7 @@
           />
         </button>
         <button
-          class="btn btn-default"
+          class="btn button-default"
           :disabled="!moveDnValid"
           @click="moveDn"
         >
@@ -114,7 +114,7 @@
           />
         </button>
         <button
-          class="btn btn-default"
+          class="btn button-default"
           :disabled="usingFallback"
           @click="add"
         >
-- 
cgit v1.2.3-70-g09d2

