From 2b9968eacd6f45dc5ad39796f1b2f488e2a22cbb Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Thu, 12 Sep 2024 16:10:39 +0300
Subject: lint

---
 src/components/shadow_control/shadow_control.vue | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'src/components/shadow_control/shadow_control.vue')

diff --git a/src/components/shadow_control/shadow_control.vue b/src/components/shadow_control/shadow_control.vue
index 77d7c15a..b867d6e0 100644
--- a/src/components/shadow_control/shadow_control.vue
+++ b/src/components/shadow_control/shadow_control.vue
@@ -60,21 +60,20 @@
       >
         {{ $t('settings.style.shadows.light_grid') }}
       </Checkbox>
-
     </div>
     <div class="shadow-switcher">
       <Select
-        class="shadow-list"
         id="shadow-list"
         v-model="selectedId"
+        class="shadow-list"
         size="10"
         :disabled="!ready || usingFallback"
       >
         <option
           v-for="(shadow, index) in cValue"
+          :key="index"
           :value="index"
           :class="{ '-active': index === Number(selectedId) }"
-          :key="index"
         >
           {{ shadow.name ?? $t('settings.style.shadows.shadow_id', { value: index }) }}
         </option>
-- 
cgit v1.2.3-70-g09d2

