From 7b99d98c553f40ec4d633d0d4fdf65f275c80e77 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 24 Nov 2020 12:32:42 +0200
Subject: Replace all use of <a> + href='#' with proper buttons

---
 src/components/settings_modal/tabs/security_tab/confirm.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/settings_modal/tabs/security_tab/confirm.vue')

diff --git a/src/components/settings_modal/tabs/security_tab/confirm.vue b/src/components/settings_modal/tabs/security_tab/confirm.vue
index 69b3811b..38c2a610 100644
--- a/src/components/settings_modal/tabs/security_tab/confirm.vue
+++ b/src/components/settings_modal/tabs/security_tab/confirm.vue
@@ -2,14 +2,14 @@
   <div>
     <slot />
     <button
-      class="btn btn-default"
+      class="btn button-default"
       :disabled="disabled"
       @click="confirm"
     >
       {{ $t('general.confirm') }}
     </button>
     <button
-      class="btn btn-default"
+      class="btn button-default"
       :disabled="disabled"
       @click="cancel"
     >
-- 
cgit v1.2.3-70-g09d2

