From f626da838a7abeb3a2d3cd5f71ee4eb2ca272361 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Thu, 24 Feb 2022 15:00:08 +0200
Subject: revert to using local setting for default nsfw since backend is
 broken

---
 src/components/settings_modal/tabs/general_tab.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/settings_modal/tabs/general_tab.vue')

diff --git a/src/components/settings_modal/tabs/general_tab.vue b/src/components/settings_modal/tabs/general_tab.vue
index 4accf0c1..5db70d77 100644
--- a/src/components/settings_modal/tabs/general_tab.vue
+++ b/src/components/settings_modal/tabs/general_tab.vue
@@ -221,7 +221,8 @@
           </label>
         </li>
         <li>
-          <BooleanSetting path="serverSide_defaultNSFW">
+          <!-- <BooleanSetting path="serverSide_defaultNSFW"> -->
+          <BooleanSetting path="sensitiveByDefault">
             {{ $t('settings.sensitive_by_default') }}
           </BooleanSetting>
         </li>
-- 
cgit v1.2.3-70-g09d2

