From edbbbaad48311d5d791183f724e819926c09e638 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 9 May 2022 23:24:35 +0300
Subject: don't use wide mode for anon viewers

---
 src/components/settings_modal/tabs/general_tab.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/settings_modal/tabs/general_tab.vue')

diff --git a/src/components/settings_modal/tabs/general_tab.vue b/src/components/settings_modal/tabs/general_tab.vue
index db8718cf..79c69449 100644
--- a/src/components/settings_modal/tabs/general_tab.vue
+++ b/src/components/settings_modal/tabs/general_tab.vue
@@ -72,6 +72,7 @@
         </li>
         <li>
           <ChoiceSetting
+            v-if="user"
             id="thirdColumnMode"
             path="thirdColumnMode"
             :options="thirdColumnModeOptions"
-- 
cgit v1.2.3-70-g09d2

