From b19c2eb0fb45aca4f4a59c4afacaffddf695987d Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 20 Oct 2020 22:13:19 +0300
Subject: More stuff. Buttons in user card's corner now have MUCH bigger
 hitboxes

---
 src/components/settings_modal/tabs/general_tab.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/settings_modal/tabs/general_tab.vue')

diff --git a/src/components/settings_modal/tabs/general_tab.vue b/src/components/settings_modal/tabs/general_tab.vue
index 9fc1470e..2ab6b314 100644
--- a/src/components/settings_modal/tabs/general_tab.vue
+++ b/src/components/settings_modal/tabs/general_tab.vue
@@ -222,7 +222,7 @@
                 v-if="!loopSilentAvailable"
                 class="unavailable"
               >
-                <i class="icon-globe" />! {{ $t('settings.limited_availability') }}
+                <FAIcon icon="globe" />! {{ $t('settings.limited_availability') }}
               </div>
             </li>
           </ul>
-- 
cgit v1.2.3-70-g09d2

