From 7e3393b5a2eda7f696781853123de8df965ffbf2 Mon Sep 17 00:00:00 2001
From: Eris <femmediscord@gmail.com>
Date: Tue, 15 Jun 2021 00:59:36 +0000
Subject: Use cleaner instance config check for shoutbox setting

---
 src/components/settings_modal/tabs/general_tab.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/settings_modal/tabs/general_tab.vue')

diff --git a/src/components/settings_modal/tabs/general_tab.vue b/src/components/settings_modal/tabs/general_tab.vue
index 8c255dd3..84f8ef8d 100644
--- a/src/components/settings_modal/tabs/general_tab.vue
+++ b/src/components/settings_modal/tabs/general_tab.vue
@@ -21,7 +21,7 @@
             {{ $t('settings.hide_wallpaper') }}
           </BooleanSetting>
         </li>
-        <li v-if="shout">
+        <li v-if="instanceShoutboxPresent">
           <BooleanSetting path="hideShoutbox">
             {{ $t('general.hide') }} {{ $t('shoutbox.title') }}
           </BooleanSetting>
-- 
cgit v1.2.3-70-g09d2

