From 3f23aecd10e570f78b4142687a9a3fa349c13018 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 23 Feb 2021 10:00:23 +0200
Subject: add sensitive by default option

---
 src/components/settings_modal/tabs/general_tab.vue | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'src/components/settings_modal/tabs/general_tab.vue')

diff --git a/src/components/settings_modal/tabs/general_tab.vue b/src/components/settings_modal/tabs/general_tab.vue
index f93f4ea0..9228c78e 100644
--- a/src/components/settings_modal/tabs/general_tab.vue
+++ b/src/components/settings_modal/tabs/general_tab.vue
@@ -144,7 +144,12 @@
         </li>
         <li>
           <BooleanSetting path="minimalScopesMode">
-            {{ $t('settings.minimal_scopes_mode') }} {{ minimalScopesModeDefaultValue }}
+            {{ $t('settings.minimal_scopes_mode') }}
+          </BooleanSetting>
+        </li>
+        <li>
+          <BooleanSetting path="sensitiveByDefault">
+            {{ $t('settings.sensitive_by_default') }}
           </BooleanSetting>
         </li>
         <li>
-- 
cgit v1.2.3-70-g09d2

