From a16e158216784071949f91074beca4b2e7382017 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 19 Jun 2024 22:16:31 +0300
Subject: better defaults, fonts scale with panel scale

---
 src/components/settings_modal/tabs/appearance_tab.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/settings_modal/tabs/appearance_tab.vue')

diff --git a/src/components/settings_modal/tabs/appearance_tab.vue b/src/components/settings_modal/tabs/appearance_tab.vue
index 75126df7..929853f4 100644
--- a/src/components/settings_modal/tabs/appearance_tab.vue
+++ b/src/components/settings_modal/tabs/appearance_tab.vue
@@ -62,7 +62,7 @@
             path="navbarSize"
             step="0.1"
             :units="['px', 'rem']"
-            :reset-default="{ 'px': 64, 'rem': 3.5 }"
+            :reset-default="{ 'px': 55, 'rem': 3.5 }"
           >
             {{ $t('settings.navbar_size') }}
           </UnitSetting>
@@ -73,7 +73,7 @@
             path="panelHeaderSize"
             step="0.1"
             :units="['px', 'rem']"
-            :reset-default="{ 'px': 64, 'rem': 3.2 }"
+            :reset-default="{ 'px': 52, 'rem': 3.2 }"
             timed-apply-mode
           >
             {{ $t('settings.panel_header_size') }}
-- 
cgit v1.2.3-70-g09d2

