From 33777fab47b65975d343d219c0b1866ba6849b3f Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 18 Apr 2021 15:39:06 +0300
Subject: small refactoring to uncouple tab-switcher from settings modal

---
 src/components/settings_modal/settings_modal_content.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/settings_modal/settings_modal_content.vue')

diff --git a/src/components/settings_modal/settings_modal_content.vue b/src/components/settings_modal/settings_modal_content.vue
index c9ed2a38..0be76d22 100644
--- a/src/components/settings_modal/settings_modal_content.vue
+++ b/src/components/settings_modal/settings_modal_content.vue
@@ -4,6 +4,7 @@
     class="settings_tab-switcher"
     :side-tab-bar="true"
     :scrollable-tabs="true"
+    :body-scroll-lock="bodyLock"
   >
     <div
       :label="$t('settings.general')"
-- 
cgit v1.2.3-70-g09d2

