From 3e7e31d4a98f4cbdfdd3c92d952e58616c027beb Mon Sep 17 00:00:00 2001
From: Alexander Tumin <iamtakingiteasy@eientei.org>
Date: Sun, 5 Jun 2022 17:10:44 +0300
Subject: Allow column width configuration Group column configuration in
 settings Column width configuration: do not act on defaults

---
 src/components/settings_modal/helpers/choice_setting.vue | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'src/components/settings_modal/helpers/choice_setting.vue')

diff --git a/src/components/settings_modal/helpers/choice_setting.vue b/src/components/settings_modal/helpers/choice_setting.vue
index 258c7422..d141a0d6 100644
--- a/src/components/settings_modal/helpers/choice_setting.vue
+++ b/src/components/settings_modal/helpers/choice_setting.vue
@@ -19,7 +19,10 @@
         {{ option.value === defaultState ? $t('settings.instance_default_simple') : '' }}
       </option>
     </Select>
-    <ModifiedIndicator :changed="isChanged" />
+    <ModifiedIndicator
+      :changed="isChanged"
+      :onclick="reset"
+    />
     <ServerSideIndicator :server-side="isServerSide" />
   </label>
 </template>
-- 
cgit v1.2.3-70-g09d2

