From f78a5158e160fce03b333ad0aea6b2e136d42f67 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 2 Oct 2018 21:43:58 +0300
Subject: something works without exploding and i'm tired already

---
 src/components/settings/settings.vue | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/settings/settings.vue')

diff --git a/src/components/settings/settings.vue b/src/components/settings/settings.vue
index 42c660a3..eebb2cb7 100644
--- a/src/components/settings/settings.vue
+++ b/src/components/settings/settings.vue
@@ -18,6 +18,7 @@
     </transition>
   </div>
   <div class="panel-body">
+<keep-alive>
     <tab-switcher>
       <div :label="$t('settings.general')" >
         <div class="setting-item">
@@ -146,6 +147,7 @@
       </div>
 
     </tab-switcher>
+</keep-alive>
   </div>
 </div>
 </template>
-- 
cgit v1.2.3-70-g09d2

