From f1c16327b696666f291d5fb2afdf4033cf9ef76d Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 7 Sep 2018 18:17:17 +0300
Subject: Initial version

---
 src/components/settings/settings.vue | 14 +++++++++++++-
 1 file changed, 13 insertions(+), 1 deletion(-)

(limited to 'src/components/settings/settings.vue')

diff --git a/src/components/settings/settings.vue b/src/components/settings/settings.vue
index c106b79c..be7c64a7 100644
--- a/src/components/settings/settings.vue
+++ b/src/components/settings/settings.vue
@@ -1,7 +1,19 @@
 <template>
 <div class="settings panel panel-default">
   <div class="panel-heading">
-    {{$t('settings.settings')}}
+    <div class="title">
+      {{$t('settings.settings')}}
+    </div>
+
+    <template v-if="currentSaveStateNotice">
+      <div @click.prevent class="alert error" v-if="currentSaveStateNotice.error">
+        Errr
+      </div>
+
+      <div @click.prevent class="alert success" v-if="!currentSaveStateNotice.error">
+        Succ
+      </div>
+    </template>
   </div>
   <div class="panel-body">
     <tab-switcher>
-- 
cgit v1.2.3-70-g09d2

