From 8f7919388391742671ef0398e017383d7f0b2bc5 Mon Sep 17 00:00:00 2001
From: Ole Bertram <git@bertr.am>
Date: Wed, 4 Jul 2018 13:49:20 +0200
Subject: Unify button styles and use min-width

This seemed to be the same across multiple components anyway.

Switched to min-width to allow for buttons with longer text, e.g.
from other languages.
---
 src/components/settings/settings.vue | 2 --
 1 file changed, 2 deletions(-)

(limited to 'src/components/settings/settings.vue')

diff --git a/src/components/settings/settings.vue b/src/components/settings/settings.vue
index 6245e758..4786b930 100644
--- a/src/components/settings/settings.vue
+++ b/src/components/settings/settings.vue
@@ -83,8 +83,6 @@
 
   .btn {
     margin-top: 1em;
-    min-height: 28px;
-    width: 10em;
   }
 }
 .setting-list {
-- 
cgit v1.2.3-70-g09d2

