From 95e6bccec5a3bb89ca6b1511f12eb0caf5a241a4 Mon Sep 17 00:00:00 2001
From: William Pitcock <nenolod@dereferenced.org>
Date: Mon, 20 Aug 2018 18:06:29 +0000
Subject: Revert "Unify button styles and use min-width"

This reverts commit 8f7919388391742671ef0398e017383d7f0b2bc5.
---
 src/components/settings/settings.vue | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/settings/settings.vue')

diff --git a/src/components/settings/settings.vue b/src/components/settings/settings.vue
index 170f5773..415317f0 100644
--- a/src/components/settings/settings.vue
+++ b/src/components/settings/settings.vue
@@ -117,6 +117,8 @@
 
   .btn {
     margin-top: 1em;
+    min-height: 28px;
+    width: 10em;
   }
 }
 .setting-list {
-- 
cgit v1.2.3-70-g09d2

